SN-Search - AMANDA-B-4

1

10

10^2

10^3

10^4

2000 2100 2200 x 10^2

Summed Counting Rate per 10 sec .

Number of 10 sec intervals

21.7 days (1996)

8

SN1987A 8kpc

8

SN1987A 6kpc