dr / μm

double hit resolution single

0 1000

2000

3000

4000

5000

6000

7000

-100 -50 0 50 100

P1 4641. P2 -0.4806 P3 16.61 P4 312.6

dr / μm 0

500

1000

1500

2000

2500

3000

-50 0 50 100

P1 1844. P2 1.019 P3 19.15 P4 115.2