dr / μm

BST residuals best

0 20 40 60 80 100 120 140 160 180 200

-50 0 50

P1 131.7 P2 5.410 P3 13.22 P4 1.819

dr / μm 0 20 40 60 80 100 120 140 160 180 200

-50 0 50

P1 117.2 P2 -3.852 P3 14.75 P4 1.361