z BST1-CT , cm

BST external resolution

0 100 200 300 400 500 600 700 800

-2 -1 0 1 2

P1 452.6 P2 0.3276E-01 P3 0.3388 P4 57.15

z BST2-CT , cm 0 50 100 150 200 250 300 350 400 450 500

-1 0 1 2

P1 298.2 P2 -0.1326E-01 P3 0.2655 P4 26.50