θ BST1-BDC , mrad

BST external resolution

0 50 100 150 200 250 300 350 400 450 500

-2 0 2

P1 312.8 P2 0.7497E-01 P3 0.4350 P4 15.03

θ BST2-BDC , mrad 0

20

40

60

80

100

120

-2 0 2

P1 69.05 P2 0.3795E-01 P3 0.5882 P4 6.628