Conclusions

• FIRCLA turns out to be quite effective in doing calculations of diagrams with 5 external legs. It can be good instrument for evaluation of e+e− → 4 fermions • Parallelization of Maple jobs is very desirable. Nodes of PC like lattice people are using can be very helpful for doing analytic as well as numeric calculations of cross sections