Results for each diagram separatly were stored in file ∼ 100 MB (∼ 5MB in Maple format) Dk =^∑ i,j Ai,jIiOj Ii - master integrals, Oj - spinor amplitudes

The sum of all diagrams is gauge invariant !

• Each pentagon diagram separatly gave only gauge invarant pentagon integrals - 15 in a total • huge reduction in the number of D0, C0,B0, integrals

From 240 C0 79 remain in the final answer

• The file with final gauge invariant result ∼ 1.2 MB in Maple format

Problem - compact representation of the result, mainly ratios of huge polynomials depending on several variables

Evaluation of bremstrahlung, numerical evaluation of the cross section- work in progress