EVALUATION: some details

• parallel version of FORM3 /Fliegner, Retey, Vermaseren (2000)/ running on a powerful 8-alpha-processor- SMP-machine with disk space of 350 GB

• calculations took approximately 500 hours in total. The time includes ≈ 300 hours spent on the single diagram

which demonstrates that trivial parallelization by assigning different diagrams to different machines is not feasible

• exact answer was reconstructed from results of these expansions.

• Extensive tests were performed:

Dealing with four-loop integrals, the result cannot have the singularities stronger then 1/(D−4)^4 in D → 4 limit. The contributions corresponding to individual master integrals have poles up to 1/(D − 4)^6 which cancel in the final expression. Furthermore, singular parts of all diagrams were checked by MINCER. Previously obtained four-loop results were successfully reproduced.