MJD [days]

49000 50000 51000 52000 53000 54000 55000

Integral Flux >1TeV [Crab]

0

2

4

6

8

10

12

14

16

1 Crab level

1992 1993 1994 1995 1996 1997 1998 1999 2000 2001 2002 2003 2004 2005 2006 2007 2008 2009

Mrk 421 longterm VHE lightcurve

HEGRA CTS HEGRA CT1 H.E.S.S. MAGIC Whipple/VERITAS CAT 51860 51880 51900 51920 51940 51960 51980 52000 52020 52040 52060 0 2 4 6 8 10 12 14 16 zoom: 2000/2001